Attached Devices and VPS (OpenVZ and Virtuozzo)
===============================================
:author: Aaron Ball
:email: nullspoon@iohq.net



*Note to self:* When hosting on a VPS using OpenVZ or Virtuozzo, to list
attached devices and their mount points, "fdisk -l" doesn't work ("cannot open
/proc/partitions") and "/proc/partitions" doesn't exist.  To list all mount
points, run *df -h* : lists all drives and their free space

/etc/fstab still works as it should.


Category:Linux
Category:Virtualization


// vim: set syntax=asciidoc:
